IDEMIMAR_HATCH_FILE
BETON_KESIDI_1
DEFAULT_SCALE
0.25
LINE
0
0
1
1
LINE
0
0.3
0.3
0.6
LINE
0
0.7
0.2
0.9
LINE
0.3
0
0.6
0.3
LINE
0.8
0.1
1
0.3
LINE
0.8
0.5
1
0.7
LINE
0.5
0.8
0.7
1
